LIBRARY         KGINA

DESCRIPTION     'Alternate Windows NT Logon GUI'

EXPORTS
; Version 1.0
        WlxNegotiate
        WlxInitialize
        WlxDisplaySASNotice
        WlxLoggedOutSAS
        WlxActivateUserShell
        WlxLoggedOnSAS
        WlxDisplayLockedNotice
        WlxWkstaLockedSAS
        WlxIsLockOk
        WlxIsLogoffOk
        WlxLogoff
        WlxShutdown
; Version 1.1
	WlxScreenSaverNotify
	WlxStartApplication
