2 2 1 2 2 1

Contacts 2 2 Contact Spacing

2

1

1 3 Via 2 2 2 2 2 2 Via Spacing

2

5 5 5 2 2

9 5 2 2

2 4 5

Substrate Contact

Well Contact

Well Contact Well

2

2

Select

3 3

2 2

1 2 3

3 3

3 4

Active

Poly

Metal

Metal2

Poly-Active 1

Contact

Substrate

2 Poly2 3 1 1

1 2 2

3 3

Poly2 - Poly Edges

MOSIS SCGE Design Rules (Feb-90)

Poly2 - Contact Spacing /lib/designrules/rules.ff