\parskip=0in
%\raggedright
%\pretolerance = 10000
%\lineskip = 0.2in
%\lineskiplimit = 0.2in
\tolerance = 500
\input ./psmac.tex
\nopagenumbers

\sevenrm
\bf

 %
%
\centerline{\pspic{8in 8in ./rules}}
%
%

\vskip 6mm
\noindent

\bye