\section{LINSPACE Linearly Spaced Vector}

\subsection{Usage}

Generates a row vector with the specified number of elements, with
entries uniformly spaced between two specified endpoints.  The syntax
for its use is either
\begin{verbatim}
   y = linspace(a,b,count)
\end{verbatim}
or, for a default \verb|count = 100|,
\begin{verbatim}
   y = linspace(a,b);
\end{verbatim}
\subsection{Examples}

Here is a simple example of using \verb|linspace|
\begin{verbatim}
--> x = linspace(0,1,5)

x = 

         0    0.2500    0.5000    0.7500    1.0000 


\end{verbatim}
