\section{LOGSPACE Logarithmically Spaced Vector}

\subsection{Usage}

Generates a row vector with the specified number number of elements,
with entries logarithmically spaced between two specified endpoints.
The syntax for its use is either
\begin{verbatim}
    y = logspace(a,b,count)
\end{verbatim}
 or, for a default \verb|count = 100|,
\begin{verbatim}
    y = logspace(a,b)
\end{verbatim}
 A third special use is when
\begin{verbatim}
    y = logspace(a,pi)
\end{verbatim}
where it generates points between \verb|10^a| and \verb|pi|

Contributed by Paulo Xavier Candeias under GPL.
\subsection{Example}

Here is an example of the use of \verb|logspace|
\begin{verbatim}
--> logspace(1,2,3)

ans = 

   1.0e+02 * 

    0.1000    0.3162    1.0000 


\end{verbatim}
