\section{DBSTOP}

\subsection{Usage}

Set a breakpoint.  The syntax for this is:
\begin{verbatim}
  dbstop(funcname,linenumber)
\end{verbatim}
where \verb|funcname| is the name of the function where we want
to set the breakpoint, and \verb|linenumber| is the line number.
