\section{ERRORCOUNT Retrieve the Error Counter for the Interpreter}

\subsection{Usage}

This routine retrieves the internal counter for the interpreter,
and resets it to zero.  The general syntax for its use is
\begin{verbatim}
   count = errorcount
\end{verbatim}
