\section{SLEEP Sleep For Specified Number of Seconds}

\subsection{Usage}

Suspends execution of FreeMat for the specified number
of seconds.  The general syntax for its use is
\begin{verbatim}
  sleep(n),
\end{verbatim}
where \verb|n| is the number of seconds to wait.
