\section{GCA Get Current Axis}

\subsection{Usage}

Returns the handle for the current axis.  The syntax for its use
is
\begin{verbatim}
  handle = gca
\end{verbatim}
where \verb|handle| is the handle of the active axis.  All object
creation functions will be children of this axis.
