\section{HPOINT Get Point From Window}

\subsection{Usage}

This function waits for the user to click on the current figure
window, and then returns the coordinates of that click.  The
generic syntax for its use is
\begin{verbatim}
  [x,y] = hpoint
\end{verbatim}
