\section{ISHOLD Test Hold Status}

\subsection{Usage}

Returns the state of the \verb|hold| flag on the currently active
plot.  The general syntax for its use is
\begin{verbatim}
   ishold
\end{verbatim}
and it returns a logical 1 if \verb|hold| is \verb|on|, and a logical
0 otherwise.
