\section{GETPRINTLIMIT Get Limit For Printing Of Arrays}

\subsection{Usage}

Returns the limit on how many elements of an array are printed
using either the \verb|disp| function or using expressions on the
command line without a semi-colon.  The default is set to 
one thousand elements.  You can increase or decrease this
limit by calling \verb|setprintlimit|.  This function is provided
primarily so that you can temporarily change the output truncation
and then restore it to the previous value (see the examples).
\begin{verbatim}
   n=getprintlimit
\end{verbatim}
where \verb|n| is the current limit in use.
\subsection{Example}

Here is an example of using \verb|getprintlimit| along with \verb|setprintlimit| to temporarily change the output behavior of FreeMat.
\begin{verbatim}
--> A = randn(100,1);
--> n = getprintlimit

n = 

 1000 

--> setprintlimit(5);
--> A

ans = 

    0.6082 
    0.6264 
    0.6468 
   -0.4669 
    0.8649
Print limit has been reached.  Use setprintlimit function to enable longer printouts
--> setprintlimit(n)

\end{verbatim}
