\section{SETPRINTLIMIT Set Limit For Printing Of Arrays}

\subsection{Usage}

Changes the limit on how many elements of an array are printed
using either the \verb|disp| function or using expressions on the
command line without a semi-colon.  The default is set to 
one thousand elements.  You can increase or decrease this
limit by calling
\begin{verbatim}
  setprintlimit(n)
\end{verbatim}
where \verb|n| is the new limit to use.
\subsection{Example}

Setting a smaller print limit avoids pages of output when you forget the semicolon on an expression.
\begin{verbatim}
--> A = randn(512);
--> setprintlimit(10)
--> A

ans = 
 
Columns 1 to 10

   -1.9107    0.6750   -0.0673    0.9689   -0.6160   -1.2424    0.3498   -0.0847   -0.5226   -0.6009
Print limit has been reached.  Use setprintlimit function to enable longer printouts
--> setprintlimit(1000)

\end{verbatim}
