\section{ASIND Inverse Sine Degrees Function}

\subsection{Usage}

Computes the inverse sine of the argument, but returns
the argument in degrees instead of radians (as is the case
for \verb|asin|). The syntax for its use is
\begin{verbatim}
   y = asind(x)
\end{verbatim}
\subsection{Examples}

The inverse sine of \verb|sqrt(2)/2| should be 45 degrees:
\begin{verbatim}
--> asind(sqrt(2)/2)

ans = 

   45.0000 


\end{verbatim}
and the inverse sine of \verb|0.5| should be 30 degrees:
\begin{verbatim}
--> asind(0.5)

ans = 

   30.0000 


\end{verbatim}
