\section{LOG1P Natural Logarithm of 1+P Function}

\subsection{Usage}

Computes the \verb|log| function for one plus its argument.  The general
syntax for its use is
\begin{verbatim}
  y = log1p(x)
\end{verbatim}
where \verb|x| is an \verb|n|-dimensional array of numerical type.
