

drop table venus_instances;
drop table venus_init_insts;
drop table venus_names;
drop table vice_instances;
drop table vice_names;
drop table sessions;
drop table volume_info;
drop table session_stats;
drop table cache_stats;
drop table advice_stats;
drop table client_rvm_stats;
drop table vcb_stats;
drop table normal_events;
drop table normal_opcodes;
drop table mcache_events;
drop table mcache_vnode;
drop table mcache_vfs;
drop table mcache_vnode_names;
drop table mcache_vfs_names;
drop table comm_events;
drop table overflows;
drop table server_stats;
drop table srvr_call_names;
drop table srvr_mltcall_names;
drop table clnt_call_names;
drop table clnt_mltcall_names;
drop table srvr_calls;
drop table srvr_mltcalls;
drop table clnt_calls;
drop table clnt_mltcalls;
drop table rvm_res_entry;
drop table rvm_res_stats;
drop table log_size_hist;
drop table log_max_hist;
drop table succ_hier_hist;
drop table fail_hier_hist;
drop table var_log_hist;
drop table rvm_res_log_hist;
drop table srv_overflow;
drop table advice_discomiss;
drop table advice_reconn;
drop table iot_info;
drop table iot_stats;
drop table repair_stats;
drop table subtree_stats;
drop table rws_stats;

